---
title: Scale Int
sidebar:
  label: Scale
  order: 3
---
import SchemaInfo from '../../../../components/SchemaInfo.astro';

This processor will scale an integer value from one range to another. This processor will return an error if the message being processed is not an integer or if the parameters are not valid (e.g. if `inMin` is greater than or equal to `inMax`, etc.).

<SchemaInfo type="processor" id="int.scale"/>

### Example

Scale an integer value from the range 0-255 to the range 0-100

```yaml
- id: scale
  type: int.scale
  params:
    inMin: 0
    inMax: 255
    outMin: 0
    outMax: 100
```
