---
title: Create Random Float
sidebar:
  label: Random
  order: 2
---
import SchemaInfo from '../../../../components/SchemaInfo.astro';

The `float.random` processor will set the payload to a random float between the specified `min` and `max` value.

<SchemaInfo type="processor" id="float.random"/>

### Example

This would generate a random 64-bit float between 1.1 and 1.5 and set the payload to that value.

```yaml
- type: float.random
  params:
    bitSize: 64
    min: 1.0
    max: 1.5
```
